FIGURE 12

*CP-10

*CP-15

*CP-20

*CP-25

*CP-30

*CP-35

*CP-40

*CP-45

*CP-50

*CP-55

*CP-60

*CP-65

*CP-70

*CP-75

*CP-80

*CP-85

*CP0-5

*EP1

*EP2

*EP3

*EP4

*EP5

*EP6

*EP7

Plate with a Free Edge

Geometry Model